% Warren's A4 definitions. The top set is ok, but I had to change to the
% bottom set ot meet the Ph.D layout requirements.
%
% \setlength{\textwidth}{6.4in}
% \setlength{\oddsidemargin}{0in}
% \setlength{\evensidemargin}{0in}
% \setlength{\textheight}{9.4in}
% \setlength{\topmargin}{-0.4in}
% \setlength{\parskip}{5pt}
% \setlength{\parindent}{0pt}

\setlength{\textwidth}{150mm}
\setlength{\oddsidemargin}{15mm}
\setlength{\evensidemargin}{15mm}
\setlength{\textheight}{248mm}
\setlength{\topmargin}{-8mm}
\setlength{\parskip}{7pt}
\setlength{\baselineskip}{16pt}
\setlength{\parindent}{0pt}
